Seminar zum LA-AGP Vorlage 7

3.2. Fällungstitrationen Äquivalenzpunktbestimmung

Eosin (als Adsorptionsindikator)

3.3. Komplexometrie

Metallindikator Eriochromschwarz T EDTA-Komplex

3.4. Redoxtitrationen

Methode Basisreaktion Endpunktsind. Bestimmungen Mangano- MnO_4^– + 8H^+ + 5e^– −−→ Mn^{2+} + 4H_2O Selbstindikation Fe^{2+}, H_2O_2, MnO_4^– + 4H^+ + 3e^– −−→ MnO_2 ↓ + 2 H_2O (Farbe) C_2O_4^{2–}, MnO_2 Iodo- direkt: I_2 + 2e^– −−→ 2I^– I_2/Stärke S^{2–}, H_3AsO_3, SO_2 + H_2O (Wasserbestimmung nach Karl-Fischer) Rücktitr. 2S_2O_3^{2–} + I_2 −−→ S_4O_6^{2–} + I^– I_2/Stärke MnO_4^–, CrO_4^{2–}, IO_3^–, BrO_3^–, ClO^–, Sb^VO_4^{3–}, MnO_2, H_2O_2 Bromato- BrO_3^– + 6e^– + 6H^+ −−→ Br^– + 3H_2O Brombild.: BrO_3^– + 5Br^– + 6H^+ −−→ 3Br_2 + 3H_2O

Sn_22+, Sb^{3+}, As^{3+}

Ceri- Ce^{4+} + e^– −−→ Ce^{3+} Selbstindikation, potentiometrisch

Fe^{2+}

Dichromato- Cr_2O_7^{2–} + 14H^+ + 6e −−→ 2Cr^{3+} + 7H_2O potentiometrisch, Redoxindikator

Beispiele für Redoxtitrationen

Reaktion des Redoxindikators Diphenylamin (E=0.76 V)