Vorlesung: Intermetallische Phasen Vorlage 8.1

8. NiAs-Phasen und Varianten (A2-B2-Systeme) Ge Sn As Sb Bi Se Te A_2B AB A_2B AB AB AB_2 AB AB_2 AB AB AB_2 AB AB_2 Ti - - - - - - - - - - □ - □ V - - - - - - - - - • □ • - Cr - - - - • - • - - • - • - Mo - - - - - - - - - - M M W - - - - - - - - - - M M Mn ∘ - ∘ - • - • - • - - • ♦ Fe ∘ - - • • - • - - • - • - Co ∘ - - • • - • - - • ♦ • □ Ni ∘ • - • • - • - • • ♦ • □ Ru - - - - - - - - - - ♦ - ♦ Pd - • - • - ♦ • ♦ - - - • □ Os - - - - - - - - - - ♦ - ♦ Pt - • - • - ♦ • ♦ • - □ • □ Cu - - - • - - - - - - - - - Au - - - • - - - ♦ - - - - -

7.1. NiAs

NiAs-Struktur (NiAs_6-Oktaeder)

B EN Bereich der -Element c/a-Verhältnisse S 2.5 1.54 - 1.75 Se 2.4 1.46 - 1.74 Te 2.1 1.37 - 1.66 As 2.0 1.39 - 1.53 Sb 1.9 1.25 - 1.40 Bi 1.9 1.31 - 1.42 Ge 1.8 1.25 - 1.27 Sn 1.8 1.21 - 1.40

7.2. Varianten des NiAs-Typs (CdI_2 und Ni_2Ge)

CdI_2-Struktur (CdI_6-Oktaeder)

Ni_2Ge-Struktur (NiGe_6: Oktaeder;

NiGe_5: trigonale Bipyramiden) 7.3. Pyrit-Typ 7.4. MoS_2-Typ

Pyrit-Struktur MoS_2-Struktur (MoS_6: trigonale Prismen)